-- DB Version: 17
-- OS Type: linux
-- DB Type: web
-- Total Memory (RAM): 512 MB
-- Data Storage: hdd

ALTER SYSTEM SET
 max_connections = '200';
ALTER SYSTEM SET
 shared_buffers = '128MB';
ALTER SYSTEM SET
 effective_cache_size = '384MB';
ALTER SYSTEM SET
 maintenance_work_mem = '32MB';
ALTER SYSTEM SET
 checkpoint_completion_target = '0.9';
ALTER SYSTEM SET
 wal_buffers = '3932kB';
ALTER SYSTEM SET
 default_statistics_target = '100';
ALTER SYSTEM SET
 random_page_cost = '4';
ALTER SYSTEM SET
 effective_io_concurrency = '2';
ALTER SYSTEM SET
 work_mem = '327kB';
ALTER SYSTEM SET
 huge_pages = 'off';
ALTER SYSTEM SET
 min_wal_size = '1GB';
ALTER SYSTEM SET
 max_wal_size = '4GB';
